(degrees) Vψ 0 20 40 60 80 100 120 140 160 180

)^2c (MeV/ eem

0 5 10 15 20 25 30 35 40 45 50

1−10

1

10 10% - = 2.76 TeV, 0 NNs Pb, - ALICE Simulation, Pb < 0.8 eη,c

> 0.4 GeV/

T, e p -e^+ e→γ

B)